Field D00511110_z_36_r5p1_sext: FWHM map +90°00' +90°00'-00°05' -00°05'-00°00' -00°00'+00°05' +00°05'+00°10' +00°10'0.820.840.860.880.900.92

arcsec

PSF FWHM

-6-4-20246

%