Field D00511110_z_36_r5p1_sext: χ#ϕϕυ2 /δ.ο.ϕ. μαπ +90°00' +90°00'-00°05' -00°05'-00°00' -00°00'+00°05' +00°05'+00°10' +00°10'0.00.20.40.60.81.01.2

<χ#ϕϕυ2_{/δ.ο.ϕ.>}